PART II MATERIALS AND PRINCIPLES OF CONSTRUCTION AND MARKING OF MEASURES OF LENGTH
18 Every measure of length which is not graduated or subdivided shall be marked conspicuously, legibly and durably with the words “not graduated” or “not subdivided”.
Reg. 18 in force at 27.10.1986, see reg. 1(1)