4 Application
1 Subject to paragraphs (2) and (3) below, these Regulations apply to any electrical equipment (including any electrical apparatus or device) designed or adapted for use with voltage (in the case of alternating current) of not less than 50 volts nor more than 1,000 volts or (in the case of direct current) of not less than 75 volts nor more than 1,500 volts.
2 These Regulations do not apply to the electrical equipment set out in Schedule 1 to these Regulations.
3 These Regulations do not apply to any electrical equipment supplied for export to a place which is not within any member State of the European Economic Community.