SCHEDULE 1
Column 1 EEA State	Column 2 Implementation date of the Nursing Directives	Column 3 Entry into force of the Midwifery Directive	Column 4 Relevant date in relation to the Midwifery Directive
Austria	1st January 1994	1st January 1994	1st January 1994
Belgium	28th June 1979	23rd January 1983	23rd January 1986
Cyprus	1st May 2004	1st May 2004	1st May 2004
Czech Republic	1st May 2004	1st May 2004	1st May 2004
Denmark	28th June 1979	23rd January 1983	23rd January 1986
Estonia	1st May 2004	1st May 2004	1st May 2004
Finland	1st January 1994	1st January 1994	1st January 1994
France	28th June 1979	23rd January 1983	23rd January 1986
Germany	28th June 1979	23rd January 1983	23rd January 1986
Greece	1st January 1981	23rd January 1983	23rd January 1986
Hungary	1st May 2004	1st May 2004	1st May 2004
Iceland	1st January 1994	1st January 1994	1st January 1994
Ireland	28th June 1979	23rd January 1983	23rd January 1986
Italy	28th June 1979	23rd January 1983	23rd January 1986
Latvia	1st May 2004	1st May 2004	1st May 2004
Liechtenstein	1st May 1995	1st May 1995	1st May 1995
Lithuania	1st May 2004	1st May 2004	1st May 2004
Luxembourg	28th June 1979	23rd January 1983	23rd January 1986
Malta	1st May 2004	1st May 2004	1st May 2004
Netherlands	28th June 1979	23rd January 1983	23rd January 1986
Norway	1st January 1994	1st January 1994	1st January 1994
Poland	1st May 2004	1st May 2004	1st May 2004
Portugal	1st January 1986	1st January 1986	23rd January 1986
Slovakia	1st May 2004	1st May 2004	1st May 2004
Slovenia	1st May 2004	1st May 2004	1st May 2004
Spain	1st January 1986	1st January 1986	1st January 1986
Sweden	1st January 1994	1st January 1994	1st January 1994
Switzerland	1st June 2002	1st June 2002	1st June 2002
Articles 2, 3, 4 and 5