PART 4 Amendment of Northern Ireland legislation

113
1 Article 8I (monitoring and review of certification) is amended as follows.
2 In paragraph (3)—
(a) for “3rd March 2013” substitute “ IP completion day ”;
Words in reg. 113(2)(a) substituted (15.9.2020) by The Electricity and Gas etc. (Amendment) (EU Exit) Regulations 2020 (S.I. 2020/1016), regs. 1(2), 3(35)
(b) for “third country” substitute “ country outside the United Kingdom ”;
(c) omit “and the European Commission”.
3 In paragraph (4), omit “final”.
4 Omit paragraphs (6) and (7).
5 In paragraph (8), omit “or (6)”.
6 In paragraph (12A), for “paragraphs (5) or (7)” substitute “ paragraph (5) ”.
Reg. 113 in force at 31.12.2020 on IP completion day (in accordance with 2020 c. 1, Sch. 5 para. 1(1)), see reg. 1(1)