ANNEX Publication of references of European harmonised standards in accordance with Council Directive 89/686/EEC of 21 December 1989 on the approximation of the laws of the Member States relating to personal protective equipment
ESO	Reference and title of the harmonised standard (and reference document)	First publication in OJ	Reference of superseded standard	Date of cessation of presumption of conformity of superseded standard
CEN	EN 143:2000 Respiratory protective devices — Particle filters — Requirements, testing, marking	24.1.2001	EN 143:1990	Date expired (31.8.2000)
ESO: European Standardisation Organisation: CEN: rue de Stassart/Stassartstraat 36, B-1050 Brussels, Tel. (32-2) 550 08 11; fax (32-2) 550 08 19 (http://www.cenorm.be) CENELEC: rue de Stassart/Stassartstraat 35, B-1050 Brussels, Tel. (32-2) 519 68 71; fax (32-2) 519 69 19 (http://www.cenelec.org) ETSI: 650, route des Lucioles, F-06921 Sophia Antipolis, Tel. (33) 492 94 42 00; fax (33) 493 65 47 16 (http://www.etsi.org)				
Generally the date of cessation of presumption of conformity will be the date of withdrawal (‘dow’), set by the European Standardisation Organisation, but attention of users of these standards is drawn to the fact that in certain exceptional cases this can be otherwise.				
Warning: As regards particle filters the filtering efficiency of which is exclusively or partially achieved by the use of materials based on non-woven electrically-charged fibres, this publication does not concern clauses 8.7.2.4, last sentence, 8.7.3.4, last sentence, and 10 of the standard, in respect of which there shall be no presumption of conformity with the basic health and safety requirements of Directive 89/686/EEC. This warning shall also be taken into account in the application of the following harmonised standards: EN 149:2001; EN 405:2001; EN 1827:1999; EN 12083:1998; EN 12941:1998; EN 12941:1998/A1:2003; EN 12942:1998; EN 12942:1998/A1:2002; EN 13274-7:2002.				

NOTE:
Any information concerning the availability of the standards can be obtained either from the European Standardisation Organisations or from the national standardisation bodies of which the list is annexed to the Directive 98/34/EC.
Publication of the references in the Official Journal of the European Union does not imply that the standards are available in all the Community languages.
This list replaces all the previous lists published in the Official Journal of the European Union. The Commission ensures the updating of this list.
More information about harmonised standards on the Internet at http://europa.eu.int/comm/enterprise/newapproach/standardization/harmstds/