Council Implementing Decision (EU) 2015/2049
of 10 November 2015
on the launch of automated data exchange with regard to dactyloscopic data in Sweden (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Law Enforcement and Security (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/742), regs. 1, 117(b) (with regs. 117A, 117B) (as inserted by S.I. 2020/1408, regs. 1, 34); 2020 c. 1, Sch. 5 para. 1(1)