Council Directive
of 8 December 1969
on control of San José Scale
(69/466/EEC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Council Directive 2006/91/EC of 7 November 2006 on control of San José Scale (Codified version).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .