Council Directive
of 28 June 1977
on the approximation of the laws of the Member States relating to rear fog lamps for motor vehicles and their trailers
(77/538/EEC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EC) No 661/2009 of the European Parliament and of the Council of 13 July 2009 concerning type-approval requirements for the general safety of motor vehicles, their trailers and systems, components and separate technical units intended therefor (Text with EEA relevance).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I ADMINISTRATIVE PROVISIONS FOR TYPE APPROVAL

1. APPLICATION FOR EC COMPONENT TYPE-APPROVAL
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. MARKINGS
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. GRANTING OF EC COMPONENT TYPE-APPROVAL
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. EC COMPONENT TYPE-APPROVAL MARK
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.1. a rectangle surrounding the letter ‘e’ followed by the distinguishing number or letters of the Member State which has granted type approval:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. MODIFICATIONS OF THE TYPE AND AMENDMENTS TO APPROVALS
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. CONFORMITY OF PRODUCTION
6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Appendix 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Appendix 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 3 EXAMPLES OF THE EC COMPONENT TYPE-APPROVAL MARK
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II TECHNICAL REQUIREMENTS
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .