ANNEX I Reference method of measuring the I and/or G values of the parameters in Council Directive 75/440/EEC
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2000/60/EC of the European Parliament and of the Council of 23 October 2000 establishing a framework for Community action in the field of water policy.

ANNEX II Minimum annual frequency of sampling and analysis for each parameter in Directive 75/440/EEC
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .