Commission Directive 2010/81/EU
of 25 November 2010
amending Council Directive 91/414/EEC as regards an extension of the use of the active substance 2-phenylphenol
(Text with EEA relevance)

THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Council Directive 91/414/EEC of 15 July 1991 concerning the placing of plant protection products on the market, and in particular Article 6(1) thereof,
OJ L 230, 19.8.1991, p. 1.
Whereas:
(1) By Commission Directive 2009/160/EU 2-phenylphenol was included as active substance in Annex I to Directive 91/414/CEE, with the specific provision that Member States may only authorise indoor uses as a post-harvest fungicide in closed drench chambers.
OJ L 338, 19.12.2009, p. 83.
(2) On 18 June 2010 the notifier submitted information on other application techniques, such as wax treatment, dipping treatment and foam curtain treatment, in order to remove the restriction to closed drench chambers.
(3) Spain, which had been designated rapporteur Member State by Commission Regulation (EC) No 2229/2004, evaluated the additional information and submitted to the Commission on 30 July 2010 an addendum to the draft assessment report on 2-phenylphenol, which was circulated for comments to the other Member States and to the European Food Safety Authority (EFSA). In the comments received no major concerns were raised and the other Member States and EFSA did not raise any point which would exclude the extension of the use. The draft assessment report together with that addendum was reviewed by the Member States and the Commission within the Standing Committee on the Food Chain and Animal Health and finalised on 28 October 2010 in the format of the Commission review report for 2-phenylphenol.
OJ L 379, 24.12.2004, p. 13.
(4) The new information on the application techniques submitted by the notifier and the new assessment carried out by the rapporteur Member State indicate that plant protection products containing 2-phenylphenol may be expected to satisfy, in general, the requirements laid down in Article 5(1)(a) and (b) of Directive 91/414/EEC, in particular with regard to the indoor uses as a post-harvest fungicide which were examined and detailed in the Commission review report. Consequently, it is no longer necessary to restrict the use of 2-phenylphenol to closed drench chambers, as laid down in Directive 91/414/EEC as amended by Directive 2009/160/EU.
(5) Without prejudice to that conclusion, it is appropriate to obtain further information on certain specific points. Article 6(1) of Directive 91/414/EEC provides that inclusion of a substance in Annex I may be subject to conditions. Therefore, it is appropriate to require that the notifier submit further information to confirm the residue levels occurring as a result of application techniques other than those in drench chambers.
(6) Furthermore, it is also appropriate to require Member States to pay particular attention to the protection of operators and workers and ensure that conditions of use prescribe the application of adequate personal protective equipment.
(7) It is therefore appropriate to amend Directive 91/414/EEC accordingly.
(8) The measures provided for in this Directive are in accordance with the opinion of the Standing Committee on the Food Chain and Animal Health,
HAS ADOPTED THIS DIRECTIVE: