ANNEX In Annex IV to Directive 2011/65/EU the following point 26 is added:

‘26. Lead in
solders on printed circuit boards,
termination coatings of electrical and electronic components and coatings of printed circuit boards,
solders for connecting wires and cables,
solders connecting transducers and sensors,
that are used durably at a temperature below – 20 °C under normal operating and storage conditions.
Expires on 30 June 2021.’