Council Regulation (EEC) No 2930/86
of 22 September 1986
defining characteristics for fishing vessels (repealed)

Article 1 General Provision
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EU) 2017/1130 of the European Parliament and of the Council of 14 June 2017 defining characteristics for fishing vessels (recast).

Article 2 Length
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Breadth
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Tonnage
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Engine power
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Date of entry into service
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Final provisions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX

New vessels < 15 metres overall length
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Existing vessels < 15 metres overall length
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Vessels 15 metres overall length - 24 metres length between perpendiculars
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .