Article 7 Application for a certificate
1 The application for a certificate shall be lodged within six months of the date on which the authorization referred to in Article 3 (1) (b) to place the product on the market as a plant protection product was granted.
2 Notwithstanding paragraph 1, where the authorization to place the product on the market is granted before the basic patent is granted, the application for a certificate shall be lodged within six months of the date on which the patent is granted.