Article 9 Transmission of results
The results shall be transmitted within a period of 18 months from the end of the calendar year corresponding to the reference period, including confidential data, in accordance with Council Regulation (Euratom, EEC) No 1588/90 of 15 June 1990 on the transmission of data subject to statistical confidentiality to the Statistical Office of the European Communities.
OJ No L 151, 15. 6. 1990, p. 1.