CHAPTER II METHODS OF ANALYSIS

Article 8 Determination of the lactose content
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Implementing Regulation (EU) 2018/150 of 30 January 2018 amending Implementing Regulation (EU) 2016/1240 as regards methods for the analysis and quality evaluation of milk and milk products eligible for public intervention and aid for private storage.