ANNEX I The wider value range for crude ash, which is to be used as a parameter for mineral content, stems from the need to take account of the various factors that might influence its content. Given the difficulty of determining with precision the different variables which may influence the content of ash, an extended content range seems both appropriate and necessary, as does specifying a procedure not only of sampling but also of preparing the sample prior to analysis.