Council Regulation (Euratom) No 1314/2013
of 16 December 2013
on the Research and Training Programme of the European Atomic Energy Community (2014-2018) complementing the Horizon 2020 Framework Programme for Research and Innovation (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Council Regulation (Euratom) 2018/1563 of 15 October 2018 on the Research and Training Programme of the European Atomic Energy Community (2019–2020) complementing the Horizon 2020 Framework Programme for Research and Innovation, and repealing Regulation (Euratom) No 1314/2013.

TITLE I ESTABLISHMENT

Article 1 Establishment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Budget
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Association of third countries
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

TITLE II IMPLEMENTATION

CHAPTER I Implementation, management and forms of support

Article 6 Management and forms of Community support
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Rules for participation and dissemination of research results
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Cross-cutting activities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Gender equality
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 Ethical principles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Work programmes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 12 Committee procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 14 External advice and societal engagement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER II Specific fields of action

Article 15 Small and medium-sized enterprises
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 16 Public-private and public-public partnerships
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 17 International cooperation with third countries and international organisations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 18 Information, communication, exploitation and dissemination
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER III Control

Article 19 Control and audit
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 20 Protection of the financial interests of the Union
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IV Monitoring and evaluation

Article 21 Monitoring
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 22 Evaluation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

TITLE III FINAL AND TRANSITIONAL PROVISIONS

Article 23 Repeal and transitional provisions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 24 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I ACTIVITIES

Rationale for the Euratom Programme — paving the way to 2020
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Activities necessary to achieve the programme objectives

Indirect actions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(a) Supporting safety of nuclear systems (Societal challenges, Excellent science, Industrial leadership)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(b) Contributing to the development of safe, longer term solutions for the management of ultimate nuclear waste, including final geological disposal as well as partitioning and transmutation (Excellent science, Societal challenges)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(c) Supporting the development and sustainability of nuclear expertise and excellence in the Union (Excellent science)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(d) Supporting radiation protection and development of medical applications of radiation, including, inter alia, the secure and safe supply and use of radioisotopes (Excellent science, Societal challenges)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(e) Moving towards demonstration of feasibility of fusion as a power source by exploiting existing and future fusion facilities (Industrial leadership, Societal challenges)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(f) Laying the foundations for future fusion power plants by developing materials, technologies and conceptual design (Industrial leadership, Societal challenges)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(g) Promoting innovation and industry competitiveness (Industrial leadership)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(h) Ensuring availability and use of research infrastructures of pan-European relevance (Excellent science)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(i) European Fusion Programme
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

JRC direct actions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(a) Improving nuclear safety including: nuclear reactor and fuel safety, waste management including final geological disposal as well aspartitioning and transmutation; decommissioning, and emergency preparedness
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(b) Improving nuclear security including: nuclear safeguards, non-proliferation, combating illicit trafficking, and nuclear forensics
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(c) Increasing excellence in the nuclear science base for standardisation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(d) Fostering knowledge management, education and training
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(e) Supporting the policy of the Union on nuclear safety and security
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Cross-cutting activities within the Euratom Programme
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Cross-cutting activities and interfaces with the Horizon 2020 Framework Programme
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

International cooperation with third countries and international organisations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II PERFORMANCE INDICATORS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. Indicators for indirect actions

(a) Supporting safety of nuclear systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(b) Contributing to the development of safe, longer term solutions for the management of ultimate nuclear waste, including final geological disposal as well as partitioning and transmutation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(c) Supporting the development and sustainability of nuclear expertise and excellence in the Union
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(d) Supporting radiation protection and development of medical applications of radiation, including, inter alia, the secure and safe supply and use of radioisotopes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(e) Moving towards demonstration of feasibility of fusion as a power source by exploiting existing and future fusion facilities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(f) Laying the foundations for future fusion power plants by developing materials, technologies and conceptual design
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(g) Promoting innovation and industry competitiveness
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(h) Ensuring availability and use of research infrastructures of pan-European relevance
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Indicators for direct actions

(a) Impact indicator for JRC policy support
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(b) JRC scientific productivity indicator
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .