Commission Regulation (EU) No 415/2013
of 6 May 2013
laying down additional responsibilities and tasks for the EU reference laboratories for rabies, bovine tuberculosis and bee health, amending Regulation (EC) No 737/2008 and repealing Regulation (EU) No 87/2011
(Text with EEA relevance) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (31.12.2020) by The Exotic Disease (Amendment etc.) (EU Exit) Regulations 2018 (S.I. 2018/1410), regs. 1, 17; and by The Food and Feed Hygiene and Safety (Miscellaneous Amendments etc.) (EU Exit) Regulations 2020 (S.I. 2020/1504), regs. 1(2), 22; 2020 c. 1, Sch. 5 para. 1(1)

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I Responsibilities and tasks of the EU reference laboratory for rabies, additional to those laid down in Article 32(2) of Regulation (EC) No 882/2004

1. The EU reference laboratory for rabies shall coordinate, in consultation with the Commission, the methods employed in the Member States for diagnosing rabies, in particular by:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. The EU reference laboratory for rabies shall also:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. In addition, the EU reference laboratory for rabies shall perform research activities and, whenever possible, coordinate research activities directed towards the improved control and eradication of rabies, in particular by:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II Responsibilities and tasks of the EU reference laboratory for bovine tuberculosis, additional to those laid down in Article 32(2) of Regulation (EC) No 882/2004

1. The EU reference laboratory for bovine tuberculosis shall coordinate, in consultation with the Commission, the methods employed in the Member States for diagnosing bovine tuberculosis, in particular by:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. The EU reference laboratory for bovine tuberculosis shall also:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. In addition, the EU reference laboratory for bovine tuberculosis shall perform research activities and, whenever possible, coordinate research activities directed towards the improved control and eradication of bovine tuberculosis, in particular by:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III Responsibilities and tasks of the EU reference laboratory for bee health, additional to those laid down in Article 32(2) of Regulation (EC) No 882/2004

1. The EU reference laboratory for bee health shall coordinate, in consultation with the Commission, the methods employed in the Member States for diagnosing the relevant bee diseases, as necessary, in particular by:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. The EU reference laboratory for bee health shall also:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. In addition, the EU reference laboratory for bee health shall:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .