CHAPTER III ORGANISATION OF CEPOL

SECTION 1 Management Board

Article 13 Voting rules of the Management Board
1 Without prejudice to points (a) and (b) of Article 9(1), Article 11(2), Article 15, Article 23(6) and Article 27(2), the Management Board shall take decisions by a majority of its members.
2 Each member shall have one vote. In the absence of a voting member, his or her alternate shall be entitled to exercise that member's right to vote.
3 The Executive Director shall not take part in the vote.
4 The Management Board's rules of procedure shall establish detailed voting arrangements, in particular the circumstances in which a member may act on behalf of another member.