Article 1 Veterinary and Agrochemical Research Centre — CODA-CERVA, Brussels, Belgium is hereby designated as the Union (EU) reference laboratory in the field of diseases caused by capripox viruses (lumpy skin disease and sheep and goat pox).
The additional responsibilities and tasks for that laboratory are laid down in the Annex.