CHAPTER VI FINAL PROVISIONS

Article 22 Review and report
Member States shall monitor the application of the EMSWe, and report their findings to the Commission. The report shall include the following indicators:
(a) use of the harmonised reporting interface module;
(b) use of the graphical user interface;
(c) use of other means of reporting as referred to in Article 7.
Member States shall submit that report to the Commission on an annual basis, using a template to be provided by the Commission.
By 15 August 2027, the Commission shall review the application of this Regulation and shall submit to the European Parliament and the Council an assessment report on the functioning of the EMSWe on the basis of the data and statistics collected. The assessment report shall include, where necessary, an evaluation of emerging technologies which could lead to changes to or the replacement of the harmonised reporting interface module.