Commission Regulation (EU) 2019/2020
of 1 October 2019
laying down ecodesign requirements for light sources and separate control gears pursuant to Directive 2009/125/EC of the European Parliament and of the Council and repealing Commission Regulations (EC) No 244/2009, (EC) No 245/2009 and (EU) No 1194/2012
(Text with EEA relevance) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (E.W.S.) (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Lighting Products) Regulations 2021 (S.I. 2021/1095), reg. 19(e)

Article 1 Subject matter and scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Ecodesign requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Removal of light sources and separate control gears
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Conformity assessment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Verification procedure for market surveillance purposes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Circumvention
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Indicative benchmarks
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Review
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 Repeal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Entry into force and application
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I Definitions applicable for the Annexes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II Ecodesign requirements
For the purposes of compliance and verification of compliance with the requirements of this Regulation, measurements and calculations shall be made using harmonised standards the reference numbers of which have been published for this purpose in the Official Journal of the European Union, or other reliable, accurate and reproducible methods, which take into account the generally recognised state-of-the-art.

1. Energy efficiency requirements:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Functional requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Information requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III Exemptions

1. This Regulation shall not apply to light sources and separate control gears specifically tested and approved to operate:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. In addition, this Regulation shall not apply to:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Any light source or separate control gear within the scope of this Regulation shall be exempt from the requirements of this Regulation, with the exception of the information requirements set out in point 3(e) of Annex II, if they are specifically designed and marketed for their intended use in at least one of the following applications:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV Verification procedure for market surveillance purposes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V Functionality after endurance testing
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI Benchmarks
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .