Article 1 Reaction mass of peracetic acid and peroxyoctanoic acid is approved as an active substance for use in biocidal products of product-types 2, 3 and 4 subject to the specifications and conditions set out in the Annex.
Article 2 This Regulation shall enter into force on the twentieth day following that of its publication in the Official Journal of the European Union.
This Regulation shall be binding in its entirety and directly applicable in all Member States.
Done at Brussels, 26 November 2020.
For the Commission
The President
Ursula von der Leyen