Article 4 Methodology for calculating the smart readiness indicator
1 The methodology for calculating the smart readiness indicator shall be based on the assessment of smart-ready services present or planned at design stage in a building or building unit, and of smart-ready services that are considered relevant for that building or building unit.
2 The calculation of the smart readiness scores shall be based on a common Union methodological framework set out in Annexes I to VI.
3 The standard calculation methodology set out in Annexes I to VI may be adapted in accordance with Annex VII, in particular by making a link to energy performance calculations in the scope of energy performance certification.
4 The methodology for calculating the smart readiness indicator shall be used in accordance with the conditions set out in this Regulation, in particular regarding the qualification of experts.