Citation, commencement and interpretation
1. (1) This Order may be cited as the Industrial Training (Construction Board) (Amendment) Order (Northern Ireland) 1997 and shall come into operation on 28th February 1997.
(2) “The principal Order” means the Industrial Training (Construction Board) Order (Northern Ireland) 1964.
S.R. & O. (N.I.) 1964 No. 145 as amended by S.R. & O. (N.I.) 1967 No. 236 and S.R. & O. 1994 No. 312

Amendments
2. Schedule 1 of the principal Order shall be amended as follows:
(a) in paragraph 1(a)(iii) “electric line or any structure designed for its support” shall be deleted;
(b) in paragraph 1(a)(vi) “electricity” shall be deleted;
(c) in paragraph 3(c) “electric line means a wire or wires, conductor or other means used for the purpose of conveying, transmitting or distributing electricity, or any apparatus connected therewith”, shall be deleted; and
(d) after paragraph 2(g) there shall be inserted “2(h) the activities of any establishment engaged wholly or mainly in electrical construction, installation, maintenance or repair work”.
Sealed with the Official Seal of the Department of Economic Development on
C. C. Thompson
Assistant Secretary
5th February 1997.