SCHEDULE 1 Rendering requirements

Part I Requirements to be met where specified risk material is rendered
6 To prevent recontamination of processed specified risk material by incoming specified risk material, there must be clear separation between the area of the premises where the incoming specified risk material is unloaded and rendered and the areas set aside for further processing of the heated specified risk material and the storage of finished specified risk material products.