1998 No. 77
HEALTH AND SAFETY
Electrical Equipment for Explosive Atmospheres (Certification) (Amendment) Regulations (Northern Ireland) 1998
Made 6th March 1998
Coming into operation 20th April 1998

The Department of Economic Development, being a Department designated for the purposes of section 2(2) of the European Communities Act 1972 in relation to measures for safety and consumer protection as respects electrical equipment and any provisions concerning the composition, labelling, marketing, classification or description of electrical equipment, in exercise of the powers conferred on it by that section, and of every other power enabling it in that behalf, hereby makes the following Regulations:
S.I.1972/1811
1972 c. 68