7 Amendment of Schedules to the 1997 Regulations
1 In Schedule 1 to the 1997 Regulations (voucher letter codes and face values — supply and replacement) in column 3 (face value of voucher) for each amount specified in column 1 of the Table below (old amount) there shall be substituted the amount specified in relation to it in column 2 of that Table (new amount).
TABLE
Column 1	Column 2
Old amount	New amount
£ 28·70	£ 29·30
£ 43·60	£ 44·50
£ 59·40	£ 60·60
£134·20	£136·90
£ 49·50	£ 50·50
£ 63·00	£ 64·30
£ 75·80	£ 77·30
£147·50 (in both places where it appears)	£150·50
£ 42·00	£ 42·80
Schedule 1 is substituted by Part I of the Schedule to S.R. 1999 No. 111
2 In Schedule 2 to the 1997 Regulations (prisms, tints, photochromic lenses, small and special glasses and complex appliances)—
(a) in paragraph 1(1)(a) (prism — single vision lens) for “£6·00” there shall be substituted “£6·10”;
(b) in paragraph 1(1)(b) (prism — other lens) for “£6·90” there shall be substituted “£7·00”;
(c) in paragraph 1(1)(c) (single vision tinted lens) for “£3·00” there shall be substituted “£3·10”;
(d) in paragraph 1(1)(d) (other tinted lens) for “£3·50” there shall be substituted “£3·60”;
(e) in paragraph 1(1)(e) (small glasses)—
(i) in sub-head (i) for “£47·30” there shall be substituted “£48·20”,
(ii) in sub-head (ii) for “£42·00” there shall be substituted “£42·80”, and
(iii) in sub-head (iii) for “£22·70” there shall be substituted “£23·20”;
(f) in paragraph 1(1)(g) (specially manufactured frames) for “£47·30” there shall be substituted “£48·20”;
(g) in paragraph 2(a) (minimum complex appliance payment — single vision lenses) for “£10·00” there shall be substituted “£10·20”; and
(h) in paragraph 2(b) (minimum complex appliance payment – other cases) for “£25·40” there shall be substituted “£25·90”.
3 For Schedule 3 to the 1997 Regulations (voucher values — repair) there shall be substituted the Schedule 3 set out in the Schedule.
Schedule 3 is substituted by Part II of the Schedule to S.R. 1999 No. 111