SCHEDULE Schedule 3 to the 1997 Regulations as substituted by these Regulations
Regulation 7(3)

“SCHEDULE 3 Voucher Value — Repair
Regulation 19(2) and (3)

Letter Codes — Values
Nature of repair to appliance	A	B	C	D	E	F	G	H & I
	£	£	£	£	£	£	£	£
Repair or replacement of one lens	9·10	16·70	24·80	63·00	19·80	26·50	33·20	69·80
Repair or replacement of 2 lenses	18·40	33·60	49·70	125·90	39·60	53·10	66·40	139.50
Repair or replacement of: the front of a frame	9·40	9·40	9·40	9·40	9·40	9·40	9·40	9·40
a side of a frame	5·60	5·60	5·60	5·60	5·60	5·60	5·60	5·60
the whole frame	11·00	11·00	11·00	11·00	11·00	11·00	11·00	11·00”