SCHEDULE
(1)	(2)	(3)	(4)
Location	Position of Stands or Starting Places	Maximum Number of Taxis	Hours Available for Use
The Dock Wall Square	North-West side: from a point approximately 6 metres north-west of its junction with Dock Street, for a distance of 60 metres in a north-westerly direction. Taxis shall stand in a single line by the kerb line and parallel therewith, facing south-east.	10	At any time.