SCHEDULE 2 CONDITIONS AND REQUIREMENTS TO BE COMPLIED WITH BY THE RAILWAY UNDERTAKING
7 The protecting signals shall be controlled from the signal box containing the crossing control point. This control point shall be located so that there is a clear view of the crossing from it.