15 Fees payable in respect of gas safety functions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (16.1.2006) by The Health and Safety (Fees) Regulations (Northern Ireland) 2005 (S.R. 2005/523), regs. 1(1), 17(1) (with reg. 17(2))