2004 No. 477
HEALTH AND PERSONAL SOCIAL SERVICES
The Primary Medical Services (Sale of Goodwill and Restrictions on Sub-contracting) Regulations (Northern Ireland) 2004
Made 16th November 2004
Coming into operation 16th December 2004

The Department of Health, Social Services and Public Safety, in exercise of the powers conferred on it by Articles 15D, 17, 57E, 60 and 106(b) of, and paragraphs 1(c) and 2(3) of Schedule 10 to, the Health and Personal Social Services (Northern Ireland) Order 1972, and all other powers enabling it in that behalf, hereby enables the following Regulations:
SeeS.I.1999/283 (N.I. 1) Article 3(6)
S.I.1972/1265 (N.I. 14), Article 15D was inserted by S.I.1997/1177(N.I. 7) – Article 22; S.I.2004/311 (N.I. 2) – Article 6; Article 57E was inserted by S.I.2004/311 (N.I. 2) – Article 4; Schedule 10 was substituted by Section 55 of, and Schedule 3 to, the Health and Personal Social Services Act (Northern Ireland) 2001 (2001 c. 3 (N.I.)) and amended by S.I.2004/311, paragraph 11