PART II AMENDMENTS TO THE 1992 ORDER

6 Licences
1 For Article 10(1)(c) there shall be substituted the following sub-paragraph—

“(c) to supply electricity to any premises.”

2 For Article 10(2) there shall be substituted the following paragraphs—

“2 A licence under Article 10(1)(c) may authorise the holder to supply electricity—
(a) to any premises;
(b) only to premises specified in the licence, or to premises of a description so specified; or
(c) only to any premises situated in a specified area, or to premises of a specified description which are so situated.
2A The grantor may, with the consent of the holder of a supply licence, modify terms included in the licence in pursuance of paragraph (2) so as to extend or restrict the premises to which the licence holder may give a supply of electricity.”

3 In Article 10(3) the words “or extension” shall be deleted.
4 For Article 10(7) and (8) there shall be substituted—

“7 As soon as practicable after granting a licence, the Department shall send a copy of the licence to the Authority and, in the case of a licence under paragraph (1)(b), to any licence holder under that sub-paragraph whose interests may be affected by the grant.
8 As soon as practicable after granting any licence under paragraph (1)(b) the Authority shall send a copy of the licence to any licence holder under that sub-paragraph whose interests may be affected by the grant.”

.
Reg. 6 in operation at 1.11.2007, see reg. 1(2)