Revocations
13. (1) The Regulations specified in column 1 of Schedule 10 are revoked to the extent specified in the corresponding entry in column 3 of that Schedule.
(2) Subject to paragraph (3), the Health and Safety (Fees) Regulations (Northern Ireland) 2005 are revoked.
S.R. 2005 No. 523, amended by S.R. 2006 No. 173, S.R. 2006 No. 524 and S.R. 2006 No. 525
(3) The Regulations referred to in paragraph (2) shall continue to apply in relation to any medical examination or medical surveillance carried out before 2nd April 2007 as if these Regulations had not been made.