PART 2 DUTIES TO PRODUCE ENERGY PERFORMANCE CERTIFICATES

4 Application of Part 2
1 This Part does not apply to—
(a) buildings used as places of worship and for religious activities;
Words in reg. 4(1)(a) substituted (18.2.2013) by The Energy Performance of Buildings (Certificates and Inspections) (Amendment) Regulations (Northern Ireland) 2013 (S.R. 2013/12), regs. 1, 4(1)
(b) temporary buildings with a... time of use of 2 years or less;
Word in reg. 4(1)(b) deleted (18.2.2013) by The Energy Performance of Buildings (Certificates and Inspections) (Amendment) Regulations (Northern Ireland) 2013 (S.R. 2013/12), regs. 1, 4(2)
(c) industrial sites, workshops and non-residential agricultural buildings with low energy demand; ...
Word in reg. 4(1)(c) deleted (18.2.2013) by The Energy Performance of Buildings (Certificates and Inspections) (Amendment) Regulations (Northern Ireland) 2013 (S.R. 2013/12), regs. 1, 4(3)
(d) stand-alone buildings with a total useful floor area of less than 50 m2 that are not dwellings ; and
Word in reg. 4(1)(d) substituted for full stop (18.2.2013) by The Energy Performance of Buildings (Certificates and Inspections) (Amendment) Regulations (Northern Ireland) 2013 (S.R. 2013/12), regs. 1, 4(4)
(e) non-residential agricultural buildings which are in use by a sector covered by a national sectoral agreement on energy performance.
Reg. 4(1)(e) inserted (18.2.2013) by The Energy Performance of Buildings (Certificates and Inspections) (Amendment) Regulations (Northern Ireland) 2013 (S.R. 2013/12), regs. 1, 4(5)
2 Nothing in this Part requires an energy performance certificate to be given or made available to an owner, a prospective buyer or tenant at any time before the construction of the building has been completed.
Reg. 4 in operation at 30.6.2008 for specified purposes, see reg. 1(3)
Reg. 4 in operation at 30.9.2008 for specified purposes, see reg. 1(3)
Reg. 4 in operation at 30.12.2008 for specified purposes, see reg. 1(3)