SCHEDULE 12 (1) In Schedule 1 (injury awards and duty-related compensation), in Part 1 (calculation of awards for full-time service)—
(a) In paragraph 1—
(i) in sub-paragraph (1), for “Part 2”, substitute “Parts 2 and 3”;
(ii) in sub-paragraph (2)—
(aa) for “the Pension Scheme”, substitute “the Firefighters’ Pension Scheme or article 8 of the New Firefighters’ Pension Scheme”, and
(bb) for “that Scheme”, substitute “the Firefighters’ Pension Scheme or article 64 of the New Firefighters’ Pension Scheme; and
(iii) in the headings in the Table, after “average pensionable pay” (in both places), insert “or as the case may be, final pensionable pay”;
(b) in paragraph 2—
(i) in subparagraph (2)—
(aa) for “the Pension Scheme”, substitute “the Firefighters’ Pension Scheme or article 8 of the New Firefighters’ Pension Scheme”’ and
(bb) “that Scheme”’ substitute “the Firefighters’ Pension Scheme or article 64 of the New Firefighters’ Pension Scheme”; and
(ii) in sub-paragraph (3)—
(aa) in paragraph (a), for “the Pension Scheme”, substitute “the Firefighters’ Pension Scheme or article 19 (commutation: general) or article 21 (allocation of pension) of the New Firefighters’ Pension Scheme”, and
(bb) in sub-paragraph (b), for “that Scheme”, substitute “the Firefighters’ Pension Scheme”.