PART 2 The Renewables Obligation

11 Determining the number of renewables obligation certificates to be produced in an obligation period
1 Following the determination of calculations A and B for an obligation period, the Department is to determine the total number of renewables obligation certificates required to be produced by designated suppliers (“the total obligation”) for that period in accordance with paragraphs (2) to (5).
Art. 11(1)-(3) text amended (1.4.2010) by The Renewables Obligation (Amendment) Order (Northern Ireland) 2010 (S.R. 2010/134), art. 6(1)-(4)
2 Where calculation A is equal to or greater than calculation B for an obligation period, the total obligation for that period is calculation A.
3 ...Where calculation B is greater than calculation A for an obligation period, the total obligation for that period is calculation B.
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Art. 11(4) omitted (1.4.2010) by virtue of The Renewables Obligation (Amendment) Order (Northern Ireland) 2010 (S.R. 2010/134), art. 6(5)
5 References to the total obligation in Article 12 shall be construed accordingly.
6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Art. 11(6) omitted (1.4.2010) by virtue of The Renewables Obligation (Amendment) Order (Northern Ireland) 2010 (S.R. 2010/134), art. 6(6)
Art. 11 in operation at 1.4.2009, see art. 1