1 Citation, commencement and interpretation
1 These Regulations may be cited as the Smoke Control Areas (Exempted Fireplaces) (Amendment) Regulations (Northern Ireland) 2009 and shall come into operation on 10th August 2009.
2 In these Regulations “the Principal Regulations” means the Smoke Control Areas (Exempted Fireplaces) Regulations (Northern Ireland) 1999
S.R. 1999 No. 289 as amended by S.R. 2001 No. 211, S.R. 2003 No. 343, S.R. 2007 No. 308 and S.R.2008 No. 282