PART 2 Commencement

Provisions coming into operation on 12th October 2009
3. (1) 12th October 2009 is the day appointed for the coming into operation of the provisions of the Order specified in column 1 of the Schedule.
(2) Where a particular purpose is specified in column 2 of the Schedule in relation to any such provision, the provision shall come into operation on that date for that purpose only.

Art. 3 in operation at made date