2010 No. 67
Rates
The Rate Relief (Energy Efficiency Homes Scheme) Regulations (Northern Ireland) 2010 (revoked)
Regulations revoked (1.4.2011) by The Rate Relief (Energy Efficiency Homes Scheme) (Revocation and Savings) Regulations (Northern Ireland) 2011 (S.R. 2011/92), regs. 1, 3(1) (with reg. 3(2))
Made 8th March 2010
Coming into operation 1st April 2010

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .