PART 2 Energy Efficiency Rate Reduction

Amount of rate relief
5. The sum prescribed for the purposes of paragraph (1) of Article 30D of the 1977 Order shall be determined—
(a) in the case of cavity wall insulation, in accordance with Table 1 of Schedule 2; and
(b) in the case of loft insulation, in accordance with Table 2 of Schedule 2.