PART 2 Energy Efficiency Rate Reduction

6 Applications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (1.4.2011) by The Rate Relief (Energy Efficiency Homes Scheme) (Revocation and Savings) Regulations (Northern Ireland) 2011 (S.R. 2011/92), regs. 1, 3(1) (with reg. 3(2))