PART 2 OBLIGATIONS OF ECONOMIC OPERATORS

CHAPTER 1 MANUFACTURERS

10 Monitoring
1 When appropriate, with regard to the risks to the health and safety of end-users presented by a product, a manufacturer shall—
(a) carry out sample testing of a product manufactured by the manufacturer made available on the market;
(b) investigate complaints that a product manufactured by the manufacturer is not in conformity with Part 2; and
(c) keep distributors informed of any actions carried out under sub-paragraphs (a) and (b).
2 A manufacturer shall keep a register of—
(a) complaints that a product is not in conformity with Part 2;
(b) products which are found not to be in conformity with Part 2; and
(c) product recalls.
3 A manufacturer shall keep an entry made in the register for a period of at least 10 years beginning on the day on which the obligation to make the entry arose.