PART 2 OBLIGATIONS OF ECONOMIC OPERATORS

CHAPTER 2 IMPORTERS

Monitoring
24. (1) When deemed appropriate, with regard to the risks to the health and safety of end-users presented by a product, an importer shall—
(a) carry out sample testing of a product made available by the importer on the market;
(b) investigate complaints that a product placed on the market by the importer is not in conformity with Part 2; and
(c) keep distributors informed of actions carried out under sub-paragraphs (a) and (b).
(2) An importer shall keep a register of—
(a) complaints that a product is not in conformity with Part 2;
(b) products which are found not to be in conformity with Part 2; and
(c) product recalls.
(3) An importer shall keep an entry made in the register for a period of at least 10 years beginning on the day on which the obligation to make the entry arose.