8 Substitution of regulation 6 (certification and evaluation bodies: stationary refrigeration, air conditioning and heat pump equipment)
For regulation 6, substitute—

“6 Appointment of certification, attestation and evaluation bodies
1 The Department, after consulting the Scottish Ministers, the Welsh Ministers and the Secretary of State, may appoint such person and on such terms as the Department thinks fit to be—
(a) in relation to Commission Regulation 304/2008—
(i) a certification body for the purposes of Article 5 (personnel certificates);
(ii) an evaluation body for the purposes of Article 5; and
(iii) a certification body for the purposes of Article 8 (company certificates);
(b) for the purposes of Commission Regulation 306/2008—
(i) a certification body; and
(ii) an evaluation body;
(c) for the purposes of Commission Regulation 307/2008, an attestation body;
(d) for the purposes of Commission Regulation 2015/2066—
(i) a certification body; and
(ii) an evaluation body;
(e) in relation to Commission Regulation 2015/2067—
(i) a certification body for the purposes of Article 4 (certificates for natural persons);
(ii) an evaluation body for the purposes of Article 4; and
(iii) a certification body for the purposes of Article 6 (company certificates).
2 The Department may charge such fees as it considers will enable the recovery of any reasonable expenses incurred in reviewing an application to be appointed as a certification, evaluation and/or attestation body under paragraph (1).
3 The Department may, after consulting the Scottish Ministers, the Welsh Ministers and the Secretary of State, decide to terminate the appointment of a person appointed under paragraph (1) by giving that person notice of the decision, with reasons, in writing.”

.