SCHEDULE 5 Information to be included in emergency plans

PART 2 Information to be included in the off-site emergency plan

CHAPTER 1 Information about detailed emergency planning zones
2 The information referred to in regulation 11(3)(a) is as follows—
(a) the arrangements to set emergency procedures in motion;
(b) the arrangements to co-ordinate the off-site protective action;
(c) the arrangements for receiving early warning of incidents, and alert and call-out procedures;
(d) the arrangements for co-ordinating resources necessary to implement the off-site emergency plan;
(e) the arrangements for providing assistance to the operator with on-site mitigatory action;
(f) the arrangements for off-site protective action;
(g) the arrangements for providing the public with specific information relating to the emergency and the response or responses recommended to the public as a whole or parts of it as a result of the emergency;
(h) the arrangements for dealing with emergency exposures including the dose levels which have been determined as appropriate for the purposes of putting into effect the emergency plan;
(i) the arrangements to prioritise keeping the doses within the reference levels set out at regulation 19(1);
(j) any specific arrangements which take account of lessons learned from past emergency situations, whether at the operator’s premises or otherwise;
(k) the arrangements for carrying out an assessment of the impacts of the radiation; and
(l) the arrangements which the Executive considers necessary in the transition from a radiation emergency to an existing exposure situation, including who will be involved in such a transition and what information they are to receive.