SCHEDULES

SCHEDULE 7 Requirements for silos
1. The requirements which have to be satisfied in relation to a silo are that—
(a) it complies with paragraphs 2 to 9; or
(b) if it is designed and constructed, before 20th August 2013, in accordance with the standard on cylindrical forage tower silos published by the British Standards Institution and numbered BS 5061: 1974.
Publication date: 11th April 1974. ISBN 0-580-08070-6.