8 Amendment of the Control of Artificial Optical Radiation at Work Regulations (Northern Ireland) 2010
1 The Control of Artificial Optical Radiation at Work Regulations (Northern Ireland) 2010 are amended as follows.
S.R. 2010 No. 180
2 In regulation 3 (Assessment of the risk of adverse health effects to the eyes or skin created by exposure to artificial optical radiation at the workplace), at the end of paragraph (5)(j), insert “(as they had effect immediately before IP completion day)”.
3 In regulation 4 (Obligations to eliminate or reduce risks), in paragraph (4)(h), after “relevant European Union Directives” insert “(as they had effect immediately before IP completion day)”.