SCHEDULE 4 GRANT OF PERMITS

PART 1 APPLICATIONS FOR PERMITS
10. An advertisement in respect of application for a permit to operate more than one installation or mobile plant the application must contain the information required by paragraphs 1 and 9 respectively in relation to each such installation or plant.